\documentclass[12pt]{article}
\usepackage[utf8]{inputenc}
%\usepackage{titling}
%\usepackage{amsmath}
%\usepackage{amsfonts}
%\usepackage{amssymb}
\usepackage{graphicx}
\usepackage[font={sf}]{caption}
\usepackage{float}
%\include{style}

%
% Enter Title and Names here:
%

\def\Experiment{Title}
\def\User{B. Badger}
\def\Date{\today}
\def\Facilitator{U.W. Scientist}
\def\Device{BRB}
\def\ProposalNumber{To be assigned}

\pagestyle{myheadings}
\markright{WiPPL Run Plan Proposal}

\begin{document}

\noindent {\large \Experiment}\\
\noindent {\large User: \User}\\
\noindent {\large Facilitator: \Facilitator}\\
\noindent {\large Device: \Device}\\
\noindent {\large Date: \Date}\\
\noindent {\large Proposal Number: \ProposalNumber}\\

\section{Abstract}

Please provide a brief description of the proposed research to let your
operator, diagnosticians, and the rest of the scientific team know what it is
you’re trying to accomplish. This is an excellent opportunity to make
a first draft of an abstract for a proposed presentation or publication.

\section{Objectives of Experiment}

\begin{enumerate}
  \item A list of objectives that will give you and the WiPPL team an
    idea of the scope of the experimental study.
  \item This list should help you determine what constitutes a
    complete data set to address the big picture described in the
    Abstract.
\end{enumerate}

\section{Run Plan}

Describe the range of plasma conditions and measurements that are
required to complete the listed objectives. Given the setup time
needed to operate the BRB in a particular configuration, experiments
are typically conducted in multi-day campaigns. WiPPL staff will help
translate the desired plasma conditions into operational scenarios as
part of the collaborative development of this document. They will help
you consider contingency planning such as required conditioning,
anticipation of non-ideal shot conditions, {\em etc.}

You can also help by specifying any prioritization you may have among
different planned plasma conditions. You could indicate your
priorities in a table like Table~\ref{tab:run-plan}.

\begin{table}[H]
\centering
\begin{tabular}{|c|c|c|c|c|}
\hline
Shots & Fueling & Heating (kW) & Density (m$^{-19}$)
& Temperature (eV) \\
\hline \hline
50 & He & 250 & $10^{18}$ & 5\\
\hline \hline
\end{tabular}
\caption{Summary of run plan. Try to quantify the number of shots
  needed in each run condition based on statistical uncertainty
  considerations. Typical operation of MST anticipates reproducible
  plasma conditions to facilitate ensemble averaging over many plasma
  discharges (or shots).}
\label{tab:run-plan}
\end{table}

After determining the requisite number of shots, estimate the number
of run days required to acquire the shots. Indicate a separate planned
number of contingency days if machine conditions warrant it.

\section{Heating \& Control systems}

\subsection{Cathodes \& Anodes}
Specify the number and location (longitude and latitude) of each LaB6
cathode (up to 10) and anode. 

\subsection{Electron Cyclotron Heating}
Specify whether there will be any ECH applied. We have two 20~kW
magnetrons, each located on opposite hemispheres.

\subsection{Plasma Guns}

\subsection{Compact torus injector}

\section{Diagnostics}

To help convey the level of interest in having a diagnostic available
for the experiment, there are three categories Table~\ref{tab:diag}:
\begin{itemize}
  \item {\bf Essential}: I will not be able to complete my objectives if
    these diagnostics are unavailable. Do not schedule the run until
    they are available.
  \item {\bf Desired}: My post-shot analysis will make use of data
    from these diagnostics, but I won't postpone the run if they are
    not available.
  \item {\bf Non-essential}: I have no plans to use data from these
    diagnostics. If others can make use of data from these diagnostics
    they will be responsible for coordinating support.
\end{itemize}

\begin{table}[H]
\centering
\begin{tabular}{|c||c|c|c|c|}
\hline
Diagnostic & Needs operator & Essential & Desired & Non-essential \\
\hline \hline
mm-Wave Interferometer & No & X & & \\
3-axis Linear Hall sensor array & & & & \\
Radially scanning Mach probe & & & & \\
Triple probe & & & & \\
Visible spectrometer & & & & \\
Fabry-Perot Interferometer & & & & \\
Other (please specify) & & & & \\
\hline \hline
\end{tabular}
\caption{Diagnostic needs}
\label{tab:diag}
\end{table}

For probes that operate on the angular sweep stages, it is helpful to
specify the density of measurements desired for the angular section
covered by the probe to help estimate the number of discharges
needed.


\section{Preparatory Work}
Describe any work in the machine area that must be performed before
shots dedicated to the objectives listed can begin.

\begin{itemize}
\item List any machine modifications
\item or equipment installation
\item or calibration and alignment needs
\end{itemize}

\section{Post-shot Analysis}

Data will be stored on standard MDSplus nodes. If you are adding a
diagnostic, do we need to add additional nodes to the MDSplus tree for
this work?

If there is any post-shot analysis where will the resulting output
files be stored? This could be in a user directory on one of our
servers.

\section{Clean up}

List any steps that need to be taken to return the machine to normal
operation. List any equipment that needs to be removed from the
machine area and specify where it is supposed to go.

\end{document}
